Web track, topic distillation task results — Ajou University

Summary Statistics Run ID ajouai0302 Run Description DOCSTRUCT, NOANCHORTEXT, LINKSTRUCT Number of Topics 50 Total number of documents over all topics Retrieved: 46709 Relevant: 516 Rel-ret: 159

Recall Level Precision Averages Recall Precision 0.00 0.0666 0.10 0.0530 0.20 0.0457 0.30 0.0404 0.40 0.0372 0.50 0.0361 0.60 0.0151 0.70 0.0108 0.80 0.0049 0.90 0.0045 1.00 0.0042 Average precision over all relevant docs non-interpolated 0.0250

Document Level Averages Precision At 5 docs 0.0160 At 10 docs 0.0160 At 15 docs 0.0187 At 20 docs 0.0160 At 30 docs 0.0113 At 100 docs 0.0112 At 200 docs 0.0125 At 500 docs 0.0058 At 1000 docs 0.0032 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.0181