Web track, topic distillation task results — University of Illinois at Urbana-Champaign

Summary Statistics Run ID UIUC03Wu1 Run Description NODOCSTRUCT, NOANCHORTEXT, LINKSTRUCT Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 516 Rel-ret: 285

Recall Level Precision Averages Recall Precision 0.00 0.1492 0.10 0.1331 0.20 0.1122 0.30 0.0904 0.40 0.0820 0.50 0.0729 0.60 0.0463 0.70 0.0301 0.80 0.0240 0.90 0.0195 1.00 0.0177 Average precision over all relevant docs non-interpolated 0.0631

Document Level Averages Precision At 5 docs 0.0520 At 10 docs 0.0540 At 15 docs 0.0560 At 20 docs 0.0490 At 30 docs 0.0407 At 100 docs 0.0246 At 200 docs 0.0194 At 500 docs 0.0104 At 1000 docs 0.0057 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.0568