Web track, topic distillation task results — University of Sunderland

Summary Statistics Run ID SBBASE Run Description DOCSTRUCT, NOANCHORTEXT, LINKSTRUCT Number of Topics 50 Total number of documents over all topics Retrieved: 48400 Relevant: 516 Rel-ret: 293

Recall Level Precision Averages Recall Precision 0.00 0.3510 0.10 0.2700 0.20 0.2222 0.30 0.1626 0.40 0.1411 0.50 0.1351 0.60 0.0749 0.70 0.0555 0.80 0.0418 0.90 0.0360 1.00 0.0354 Average precision over all relevant docs non-interpolated 0.1259

Document Level Averages Precision At 5 docs 0.1280 At 10 docs 0.1020 At 15 docs 0.0853 At 20 docs 0.0680 At 30 docs 0.0560 At 100 docs 0.0304 At 200 docs 0.0195 At 500 docs 0.0099 At 1000 docs 0.0059 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1283