Robust track results — Rutgers University

Summary Statistics Run ID rutcor0350 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 692 781 1473 Mean average precision 0.0241 0.1156 0.0698 % topics with no relevant in top 10 46.0 38.0 42.0 Integral of MAP(X) curve for worst 1/4 topics 0.0001 0.0007 0.0003

Document Level Averages Precision Old New All At 5 docs 0.1360 0.2600 0.1980 At 10 docs 0.0920 0.2060 0.1490 At 15 docs 0.0733 0.1720 0.1227 At 20 docs 0.0620 0.1500 0.1060 At 30 docs 0.0613 0.1280 0.0947 At 100 docs 0.0406 0.0664 0.0535 At 200 docs 0.0324 0.0470 0.0397 At 500 docs 0.0191 0.0258 0.0224 At 1000 docs 0.0138 0.0156 0.0147 R-Precision Exact 0.0483 0.1414 0.0948