Robust track results — Rutgers University

Summary Statistics Run ID rutcor0325 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 639 699 1338 Mean average precision 0.0203 0.1007 0.0605 % topics with no relevant in top 10 52.0 38.0 45.0 Integral of MAP(X) curve for worst 1/4 topics 0.0002 0.0004 0.0002

Document Level Averages Precision Old New All At 5 docs 0.1040 0.2520 0.1780 At 10 docs 0.0780 0.2020 0.1400 At 15 docs 0.0640 0.1627 0.1133 At 20 docs 0.0590 0.1380 0.0985 At 30 docs 0.0547 0.1120 0.0833 At 100 docs 0.0358 0.0548 0.0453 At 200 docs 0.0294 0.0402 0.0348 At 500 docs 0.0172 0.0236 0.0204 At 1000 docs 0.0128 0.0140 0.0134 R-Precision Exact 0.0457 0.1314 0.0886