Robust track results — Rutgers University

Summary Statistics Run ID rutcor03100 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 734 873 1607 Mean average precision 0.0224 0.1250 0.0737 % topics with no relevant in top 10 40.0 34.0 37.0 Integral of MAP(X) curve for worst 1/4 topics 0.0002 0.0023 0.0005

Document Level Averages Precision Old New All At 5 docs 0.1160 0.2640 0.1900 At 10 docs 0.1040 0.2120 0.1580 At 15 docs 0.0867 0.1973 0.1420 At 20 docs 0.0750 0.1750 0.1250 At 30 docs 0.0660 0.1413 0.1037 At 100 docs 0.0428 0.0774 0.0601 At 200 docs 0.0311 0.0492 0.0401 At 500 docs 0.0222 0.0287 0.0255 At 1000 docs 0.0147 0.0175 0.0161 R-Precision Exact 0.0537 0.1653 0.1095