Robust track results — Rutgers University

Summary Statistics Run ID rutcor030 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 528 625 1153 Mean average precision 0.0196 0.0858 0.0527 % topics with no relevant in top 10 62.0 46.0 54.0 Integral of MAP(X) curve for worst 1/4 topics 0.0001 0.0002 0.0001

Document Level Averages Precision Old New All At 5 docs 0.0680 0.2200 0.1440 At 10 docs 0.0600 0.1640 0.1120 At 15 docs 0.0533 0.1440 0.0987 At 20 docs 0.0530 0.1260 0.0895 At 30 docs 0.0480 0.1027 0.0753 At 100 docs 0.0330 0.0484 0.0407 At 200 docs 0.0262 0.0340 0.0301 At 500 docs 0.0157 0.0211 0.0184 At 1000 docs 0.0106 0.0125 0.0115 R-Precision Exact 0.0448 0.1156 0.0802