Robust track results — OcE Technologies

Summary Statistics Run ID oce03noXbmD Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 1570 1318 2888 Mean average precision 0.0923 0.3049 0.1986 % topics with no relevant in top 10 24.0 16.0 20.0 Integral of MAP(X) curve for worst 1/4 topics 0.0027 0.0134 0.0055

Document Level Averages Precision Old New All At 5 docs 0.2760 0.5480 0.4120 At 10 docs 0.2400 0.4460 0.3430 At 15 docs 0.2227 0.3947 0.3087 At 20 docs 0.2130 0.3540 0.2835 At 30 docs 0.1833 0.2847 0.2340 At 100 docs 0.1110 0.1442 0.1276 At 200 docs 0.0803 0.0913 0.0858 At 500 docs 0.0478 0.0457 0.0467 At 1000 docs 0.0314 0.0264 0.0289 R-Precision Exact 0.1470 0.3159 0.2315