Robust track results — University of Illinois at Urbana-Champaign

Summary Statistics Run ID UIUC03Rd3 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 1933 1409 3342 Mean average precision 0.1250 0.3753 0.2502 % topics with no relevant in top 10 26.0 16.0 21.0 Integral of MAP(X) curve for worst 1/4 topics 0.0034 0.0189 0.0065

Document Level Averages Precision Old New All At 5 docs 0.3240 0.5720 0.4480 At 10 docs 0.2820 0.4980 0.3900 At 15 docs 0.2707 0.4400 0.3553 At 20 docs 0.2460 0.3980 0.3220 At 30 docs 0.2207 0.3320 0.2763 At 100 docs 0.1356 0.1708 0.1532 At 200 docs 0.0985 0.1050 0.1017 At 500 docs 0.0600 0.0512 0.0556 At 1000 docs 0.0387 0.0282 0.0334 R-Precision Exact 0.1751 0.3651 0.2701