Robust track results — University of Illinois at Urbana-Champaign

Summary Statistics Run ID UIUC03Rd2 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 1892 1402 3294 Mean average precision 0.1178 0.3639 0.2408 % topics with no relevant in top 10 24.0 16.0 20.0 Integral of MAP(X) curve for worst 1/4 topics 0.0036 0.0193 0.0069

Document Level Averages Precision Old New All At 5 docs 0.3160 0.5760 0.4460 At 10 docs 0.2800 0.4860 0.3830 At 15 docs 0.2573 0.4307 0.3440 At 20 docs 0.2350 0.3910 0.3130 At 30 docs 0.2100 0.3253 0.2677 At 100 docs 0.1286 0.1678 0.1482 At 200 docs 0.0952 0.1030 0.0991 At 500 docs 0.0579 0.0510 0.0545 At 1000 docs 0.0378 0.0280 0.0329 R-Precision Exact 0.1681 0.3598 0.2639