Robust track results — University of Illinois at Urbana-Champaign

Summary Statistics Run ID UIUC03Rd1 Run Description Automatic, description only Number of Topics 100

Topic set Old 50 New 50 All 100 Total number retrieved 50000 50000 100000 Total relevant 4416 1658 6074 Total relevant retrieved 1827 1404 3231 Mean average precision 0.1132 0.3716 0.2424 % topics with no relevant in top 10 26.0 12.0 19.0 Integral of MAP(X) curve for worst 1/4 topics 0.0031 0.0207 0.0065

Document Level Averages Precision Old New All At 5 docs 0.2800 0.5640 0.4220 At 10 docs 0.2660 0.4940 0.3800 At 15 docs 0.2467 0.4320 0.3393 At 20 docs 0.2350 0.3980 0.3165 At 30 docs 0.2053 0.3260 0.2657 At 100 docs 0.1242 0.1680 0.1461 At 200 docs 0.0918 0.1030 0.0974 At 500 docs 0.0562 0.0509 0.0536 At 1000 docs 0.0365 0.0281 0.0323 R-Precision Exact 0.1626 0.3614 0.2620