Genome track, primary task results — Institut de Recherche en Informatique de Toulouse (IRIT/SIG)

Summary Statistics Run ID vvP05mil3 Run Description Primary task, automatic Number of Topics 50 Total number of documents over all topics Retrieved: 26217 Relevant: 566 Rel-ret: 274

Recall Level Precision Averages Recall Precision 0.00 0.0743 0.10 0.0686 0.20 0.0469 0.30 0.0389 0.40 0.0348 0.50 0.0250 0.60 0.0217 0.70 0.0185 0.80 0.0151 0.90 0.0125 1.00 0.0092 Average precision over all relevant docs non-interpolated 0.0271

Document Level Averages Precision At 5 docs 0.0200 At 10 docs 0.0220 At 15 docs 0.0267 At 20 docs 0.0300 At 30 docs 0.0287 At 100 docs 0.0230 At 200 docs 0.0173 At 500 docs 0.0098 At 1000 docs 0.0055 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.0249