Genome track, primary task results — Tarragon Consulting Corporation

Summary Statistics Run ID tgnVariant1 Run Description Primary task, manual Number of Topics 50 Total number of documents over all topics Retrieved: 7758 Relevant: 566 Rel-ret: 463

Recall Level Precision Averages Recall Precision 0.00 0.5606 0.10 0.4922 0.20 0.4192 0.30 0.3577 0.40 0.3193 0.50 0.3086 0.60 0.2616 0.70 0.2083 0.80 0.1637 0.90 0.1214 1.00 0.0998 Average precision over all relevant docs non-interpolated 0.2791

Document Level Averages Precision At 5 docs 0.2720 At 10 docs 0.2220 At 15 docs 0.1973 At 20 docs 0.1780 At 30 docs 0.1480 At 100 docs 0.0758 At 200 docs 0.0422 At 500 docs 0.0184 At 1000 docs 0.0093 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2852