Genome track, primary task results — U. of Edinburgh & Stanford U.

Summary Statistics Run ID edstanprec Run Description Primary task, automatic Number of Topics 50 Total number of documents over all topics Retrieved: 10216 Relevant: 566 Rel-ret: 458

Recall Level Precision Averages Recall Precision 0.00 0.5520 0.10 0.4997 0.20 0.4655 0.30 0.3998 0.40 0.3371 0.50 0.3248 0.60 0.2874 0.70 0.2330 0.80 0.1745 0.90 0.1277 1.00 0.1173 Average precision over all relevant docs non-interpolated 0.2984

Document Level Averages Precision At 5 docs 0.2800 At 10 docs 0.2600 At 15 docs 0.2200 At 20 docs 0.1870 At 30 docs 0.1420 At 100 docs 0.0692 At 200 docs 0.0408 At 500 docs 0.0181 At 1000 docs 0.0092 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2757