Genome track, primary task results — NTT Communication Science Laboratories

Summary Statistics Run ID balsc2 Run Description Primary task, automatic Number of Topics 50 Total number of documents over all topics Retrieved: 9768 Relevant: 566 Rel-ret: 375

Recall Level Precision Averages Recall Precision 0.00 0.3734 0.10 0.3062 0.20 0.2526 0.30 0.2056 0.40 0.1562 0.50 0.1425 0.60 0.1278 0.70 0.0962 0.80 0.0678 0.90 0.0513 1.00 0.0397 Average precision over all relevant docs non-interpolated 0.1481

Document Level Averages Precision At 5 docs 0.1600 At 10 docs 0.1360 At 15 docs 0.1293 At 20 docs 0.1170 At 30 docs 0.0953 At 100 docs 0.0518 At 200 docs 0.0315 At 500 docs 0.0146 At 1000 docs 0.0075 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1386