Genome track, primary task results — Universite de Neuchatel

Summary Statistics Run ID UniNEg2 Run Description Primary task, automatic Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 566 Rel-ret: 463

Recall Level Precision Averages Recall Precision 0.00 0.3620 0.10 0.3453 0.20 0.2928 0.30 0.2312 0.40 0.1759 0.50 0.1680 0.60 0.1554 0.70 0.1333 0.80 0.1158 0.90 0.0932 1.00 0.0840 Average precision over all relevant docs non-interpolated 0.1802

Document Level Averages Precision At 5 docs 0.1720 At 10 docs 0.1300 At 15 docs 0.1187 At 20 docs 0.1050 At 30 docs 0.0873 At 100 docs 0.0562 At 200 docs 0.0341 At 500 docs 0.0166 At 1000 docs 0.0093 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1516