Genome track, primary task results — State University of New York at Buffalo-CEDAR

Summary Statistics Run ID UBgenomeBGNE Run Description Primary task, automatic Number of Topics 50 Total number of documents over all topics Retrieved: 49620 Relevant: 566 Rel-ret: 518

Recall Level Precision Averages Recall Precision 0.00 0.3737 0.10 0.3559 0.20 0.2698 0.30 0.2378 0.40 0.1834 0.50 0.1767 0.60 0.1531 0.70 0.1434 0.80 0.1281 0.90 0.1034 1.00 0.0974 Average precision over all relevant docs non-interpolated 0.1867

Document Level Averages Precision At 5 docs 0.1560 At 10 docs 0.1440 At 15 docs 0.1213 At 20 docs 0.1070 At 30 docs 0.0913 At 100 docs 0.0524 At 200 docs 0.0371 At 500 docs 0.0190 At 1000 docs 0.0104 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1603