Web track, topic distillation task results — University of Glasgow

Summary Statistics Run ID uog04cta2dqh Run Description Realistic; DOCSTRUCT, ANCHORTEXT, LINKSTRUCT Number of Topics 49 Total number of documents over all topics Retrieved: 49000 Relevant: 1574 Rel-ret: 1163

Recall Level Precision Averages Recall Precision 0.00 0.5142 0.10 0.3685 0.20 0.2703 0.30 0.2339 0.40 0.2067 0.50 0.1628 0.60 0.1441 0.70 0.0935 0.80 0.0638 0.90 0.0397 1.00 0.0332 Average precision over all relevant docs non-interpolated 0.1743

Document Level Averages Precision At 5 docs 0.2286 At 10 docs 0.2082 At 15 docs 0.1891 At 20 docs 0.1704 At 30 docs 0.1469 At 100 docs 0.1041 At 200 docs 0.0755 At 500 docs 0.0416 At 1000 docs 0.0237 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1980