Web track, topic distillation task results — City University-London

Summary Statistics Run ID pltr02wt2 Run Description Realistic; NODOCSTRUCT, NOANCHORTEXT, NOLINKSTRUCT Number of Topics 49 Total number of documents over all topics Retrieved: 49000 Relevant: 1574 Rel-ret: 1101

Recall Level Precision Averages Recall Precision 0.00 0.5036 0.10 0.3753 0.20 0.3008 0.30 0.2475 0.40 0.2191 0.50 0.1837 0.60 0.1551 0.70 0.1098 0.80 0.0821 0.90 0.0392 1.00 0.0339 Average precision over all relevant docs non-interpolated 0.1896

Document Level Averages Precision At 5 docs 0.2776 At 10 docs 0.2408 At 15 docs 0.2068 At 20 docs 0.1929 At 30 docs 0.1673 At 100 docs 0.1059 At 200 docs 0.0742 At 500 docs 0.0391 At 1000 docs 0.0225 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2153