Question Answering track, Main task results — National University of Singapore-Lee

Summary Statistics Run ID nuslamp2002 Num questions Number wrong 351 Number unsupported 27 Number inexact 17 Number right 105 Confidence-weighted score 0.396 Precision of recognizing no answer 0 / 2 = 0.000 Recall of recognizing no answer 0 / 46 = 0.000