Cross-language track results — IIT Information Retrieval Lab

Summary Statistics Run ID iit02mpl Run Description Arabic topics, automatic, title+desc Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 5909 Rel-ret: 4811

Recall Level Precision Averages Recall Precision 0.00 0.6913 0.10 0.5692 0.20 0.5031 0.30 0.4517 0.40 0.3957 0.50 0.3575 0.60 0.3125 0.70 0.2646 0.80 0.2284 0.90 0.1481 1.00 0.0273 Average precision over all relevant docs non-interpolated 0.3473

Document Level Averages Precision At 5 docs 0.4760 At 10 docs 0.4620 At 15 docs 0.4347 At 20 docs 0.4110 At 30 docs 0.3920 At 100 docs 0.3332 At 200 docs 0.2711 At 500 docs 0.1673 At 1000 docs 0.0962 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.3635