Web track, ad hoc task results — Fujitsu

Summary Statistics Run ID flabxtd Run Description Automatic, adhoc, title+desc; docstruct-notused, urltext-notused, links-notused Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3363 Rel-ret: 2449

Recall Level Precision Averages Recall Precision 0.00 0.7336 0.10 0.5296 0.20 0.4329 0.30 0.3298 0.40 0.2618 0.50 0.2195 0.60 0.1361 0.70 0.0796 0.80 0.0391 0.90 0.0139 1.00 0.0078 Average precision over all relevant docs non-interpolated 0.2332

Document Level Averages Precision At 5 docs 0.5000 At 10 docs 0.4460 At 15 docs 0.3973 At 20 docs 0.3660 At 30 docs 0.3200 At 100 docs 0.1988 At 200 docs 0.1408 At 500 docs 0.0810 At 1000 docs 0.0490 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2617