Web track, ad hoc task results — Johns Hopkins University, APL

Summary Statistics Run ID apl10wc Run Description Automatic, title only; docstruct-notused, urltext-notused, links-notused Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3363 Rel-ret: 2105

Recall Level Precision Averages Recall Precision 0.00 0.4890 0.10 0.3723 0.20 0.2513 0.30 0.2131 0.40 0.1729 0.50 0.1409 0.60 0.0940 0.70 0.0675 0.80 0.0526 0.90 0.0249 1.00 0.0143 Average precision over all relevant docs non-interpolated 0.1567

Document Level Averages Precision At 5 docs 0.2520 At 10 docs 0.2380 At 15 docs 0.2227 At 20 docs 0.2200 At 30 docs 0.1953 At 100 docs 0.1412 At 200 docs 0.1051 At 500 docs 0.0656 At 1000 docs 0.0421 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1972