Question Answering track, Main task results — University of Illinois, Urbana/Champaign

Summary Statistics Run ID UIUC Num questions 492 Mean reciprocal rank (strict) 0.165 Mean reciprocal rank (lenient) 0.193 Num answers not found (strict) 384 (78.0%) Num answers not found (lenient) 367 (74.6%) Number of times NIL returned 180 Number of times NIL correctly returned 19 Percentage of answers system confident about 63% Percentage of confident answers that were correct 14%