results — Clairvoyance Corporation

Summary Statistics Run ID clT10rtb Subtask routing TREC data used in training? no Reuters data used in training? no Other data used in training? no Number of Topics 84 Total retrieved 84000 Relevant retrieved 52135 Topics with P@1000 > 0.9 13

Recall Level Precision Averages Recall Precision 0.00 0.9226 0.10 0.3303 0.20 0.1618 0.30 0.0995 0.40 0.0446 0.50 0.0249 0.60 0.0114 0.70 0.0028 0.80 0.0013 0.90 0.0000 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1048

Document Level Averages Precision At 5 docs 0.7690 At 10 docs 0.7726 At 15 docs 0.7667 At 20 docs 0.7649 At 30 docs 0.7647 At 100 docs 0.7404 At 200 docs 0.7198 At 500 docs 0.6683 At 1000 docs 0.6207 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1444