results — David Lewis, Consultant

Summary Statistics Run ID DLewis01rUa Subtask routing TREC data used in training? no Reuters data used in training? no Other data used in training? no Number of Topics 84 Total retrieved 84000 Relevant retrieved 65645 Topics with P@1000 > 0.9 40

Recall Level Precision Averages Recall Precision 0.00 0.9477 0.10 0.5116 0.20 0.2851 0.30 0.2141 0.40 0.1324 0.50 0.0621 0.60 0.0347 0.70 0.0093 0.80 0.0000 0.90 0.0000 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1663

Document Level Averages Precision At 5 docs 0.8714 At 10 docs 0.8714 At 15 docs 0.8770 At 20 docs 0.8768 At 30 docs 0.8734 At 100 docs 0.8587 At 200 docs 0.8440 At 500 docs 0.8199 At 1000 docs 0.7815 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1974