Cross-language track results — University of California

Summary Statistics Run Number BKYCL7ME Run Description English topics, EFGI documents manual, title + desc + narr Number of Topics 28 Total number of documents over all topics Retrieved: 28000 Relevant: 4098 Rel-ret: 2648

Recall Level Precision Averages Recall Precision 0.00 0.8176 0.10 0.6064 0.20 0.5448 0.30 0.4837 0.40 0.4345 0.50 0.3636 0.60 0.2740 0.70 0.2055 0.80 0.1194 0.90 0.0692 1.00 0.0126 Average precision over all relevant docs non-interpolated 0.3390

Document Level Averages Precision At 5 docs 0.6143 At 10 docs 0.5893 At 15 docs 0.5810 At 20 docs 0.5786 At 30 docs 0.5524 At 100 docs 0.4414 At 200 docs 0.3052 At 500 docs 0.1616 At 1000 docs 0.0946 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.3881

0.0 0.2 0.4 0.6 0.8 1.0

Recall 0.0

0.2

0.4

0.6

0.8

1.0

Precision

Recall-Precision Curve

25 30 35 40 45 50

Topic

-1.0

-0.5

0.0

0.5

Difference

Difference from Median in Average Precision per Topic