dbmerge results - Universite de Neuchatel

Summary Statistics Run Number UniNE9{category B, automatic Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 654

Recall Level Precision Averages Recall Precision 0.00 0.4717 0.10 0.4064 0.20 0.3100 0.30 0.2522 0.40 0.2083 0.50 0.1802 0.60 0.1388 0.70 0.1177 0.80 0.1056 0.90 0.0806 1.00 0.0752 Average precision over all relevant docs non-interpolated 0.1985

Document Level Averages Precision At 5 docs 0.2400 At 10 docs 0.1911 At 15 docs 0.1630 At 20 docs 0.1522 At 30 docs 0.1304 At 100 docs 0.0676 At 200 docs 0.0447 At 500 docs 0.0243 At 1000 docs 0.0145

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2061

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision dbmerge results - Universite de Neuchatel

Summary Statistics Run Number UniNE0{category B, automatic Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 589

Recall Level Precision Averages Recall Precision 0.00 0.4001 0.10 0.3100 0.20 0.2374 0.30 0.1735 0.40 0.1326 0.50 0.1179 0.60 0.0800 0.70 0.0649 0.80 0.0503 0.90 0.0389 1.00 0.0337 Average precision over all relevant docs non-interpolated 0.1335

Document Level Averages Precision At 5 docs 0.2356 At 10 docs 0.1578 At 15 docs 0.1407 At 20 docs 0.1189 At 30 docs 0.1037 At 100 docs 0.0560 At 200 docs 0.0390 At 500 docs 0.0214 At 1000 docs 0.0131

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1602

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision

Summary Statistics Run Number anu5mrg0{category A, manual Number of Topics 50 Total number of documents over all topics Retrieved: 29856 Relevant: 5524 Rel ret: 2564

Recall Level Precision Averages Recall Precision 0.00 0.6815 0.10 0.4458 0.20 0.3400 0.30 0.2786 0.40 0.2175 0.50 0.1572 0.60 0.1101 0.70 0.0842 0.80 0.0564 0.90 0.0328 1.00 0.0203 Average precision over all relevant docs non-interpolated 0.1973

Document Level Averages Precision At 5 docs 0.4400 At 10 docs 0.4020 At 15 docs 0.3787 At 20 docs 0.3650 At 30 docs 0.3313 At 100 docs 0.2238 At 200 docs 0.1582 At 500 docs 0.0860 At 1000 docs 0.0513

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2395

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 270 280 290 300

Median

Topics

Average Precision

Summary Statistics Run Number anu5mrg1{category A, manual Number of Topics 50 Total number of documents over all topics Retrieved: 25340 Relevant: 5524 Rel ret: 1612

Recall Level Precision Averages Recall Precision 0.00 0.6905 0.10 0.3442 0.20 0.2627 0.30 0.2073 0.40 0.1471 0.50 0.1027 0.60 0.0350 0.70 0.0238 0.80 0.0200 0.90 0.0200 1.00 0.0200 Average precision over all relevant docs non-interpolated 0.1441

Document Level Averages Precision At 5 docs 0.4440 At 10 docs 0.3740 At 15 docs 0.3493 At 20 docs 0.3140 At 30 docs 0.2827 At 100 docs 0.1712 At 200 docs 0.1061 At 500 docs 0.0550 At 1000 docs 0.0322

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2091

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3

3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 270 280 290 300

Median

Topics

Average Precision

Summary Statistics Run Number anu5mrg7{category A, manual Number of Topics 50 Total number of documents over all topics Retrieved: 24985 Relevant: 5524 Rel ret: 1511

Recall Level Precision Averages Recall Precision 0.00 0.6491 0.10 0.3395 0.20 0.2340 0.30 0.1370 0.40 0.1042 0.50 0.0600 0.60 0.0417 0.70 0.0317 0.80 0.0165 0.90 0.0025 1.00 0.0025 Average precision over all relevant docs non-interpolated 0.1200

Document Level Averages Precision At 5 docs 0.4200 At 10 docs 0.3720 At 15 docs 0.3480 At 20 docs 0.3150 At 30 docs 0.2747 At 100 docs 0.1666 At 200 docs 0.1096 At 500 docs 0.0536 At 1000 docs 0.0302

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1724

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 270 280 290 300

Median

Topics

Average Precision dbmerge results -

Summary Statistics Run Number fsclt3m{category A, manual Number of Topics 50 Total number of documents over all topics Retrieved: 31189 Relevant: 5524 Rel ret: 1389

Recall Level Precision Averages Recall Precision 0.00 0.6019 0.10 0.3694 0.20 0.2458 0.30 0.1640 0.40 0.1182 0.50 0.0960 0.60 0.0612 0.70 0.0396 0.80 0.0337 0.90 0.0197 1.00 0.0197 Average precision over all relevant docs non-interpolated 0.1354

Document Level Averages Precision At 5 docs 0.3720 At 10 docs 0.3240 At 15 docs 0.3013 At 20 docs 0.2760 At 30 docs 0.2467 At 100 docs 0.1606 At 200 docs 0.1063 At 500 docs 0.0531 At 1000 docs 0.0278

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1890

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 270 280 290 300

Median

Topics

Average Precision