chinese results - Queens College, CUNY

Summary Statistics Run Number pircsCw{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1297

Recall Level Precision Averages Recall Precision 0.00 0.7497 0.10 0.5809 0.20 0.5272 0.30 0.4747 0.40 0.4243 0.50 0.3831 0.60 0.3339 0.70 0.2784 0.80 0.2425 0.90 0.1859 1.00 0.0525 Average precision over all relevant docs non-interpolated 0.3751

Document Level Averages Precision At 5 docs 0.5263 At 10 docs 0.4947 At 15 docs 0.4877 At 20 docs 0.4895 At 30 docs 0.4474 At 100 docs 0.3211 At 200 docs 0.2366 At 500 docs 0.1246 At 1000 docs 0.0683

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3870

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Queens College, CUNY

Summary Statistics Run Number pircsCwc{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1313

Recall Level Precision Averages Recall Precision 0.00 0.8150 0.10 0.5958 0.20 0.5116 0.30 0.4614 0.40 0.4335 0.50 0.3940 0.60 0.3453 0.70 0.2998 0.80 0.2637 0.90 0.1957 1.00 0.0714 Average precision over all relevant docs non-interpolated 0.3789

Document Level Averages Precision At 5 docs 0.5053 At 10 docs 0.4895 At 15 docs 0.4737 At 20 docs 0.4421 At 30 docs 0.4211 At 100 docs 0.3253 At 200 docs 0.2400 At 500 docs 0.1279 At 1000 docs 0.0691

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3823

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Information Technology Institute

Summary Statistics Run Number iticn1{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 17501 Relevant: 1399 Rel ret: 899

Recall Level Precision Averages Recall Precision 0.00 0.6861 0.10 0.3744 0.20 0.3039 0.30 0.2355 0.40 0.1945 0.50 0.1543 0.60 0.1270 0.70 0.0863 0.80 0.0541 0.90 0.0185 1.00 0.0119 Average precision over all relevant docs non-interpolated 0.1731

Document Level Averages Precision At 5 docs 0.3263 At 10 docs 0.3105 At 15 docs 0.2912 At 20 docs 0.2737 At 30 docs 0.2316 At 100 docs 0.1758 At 200 docs 0.1282 At 500 docs 0.0763 At 1000 docs 0.0473

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2289

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Information Technology Institute

Summary Statistics Run Number iticn2{manual Number of Topics 19 Total number of documents over all topics Retrieved: 17501 Relevant: 1399 Rel ret: 1136

Recall Level Precision Averages Recall Precision 0.00 0.8139 0.10 0.6557 0.20 0.5845 0.30 0.5241 0.40 0.4837 0.50 0.3735 0.60 0.2775 0.70 0.2082 0.80 0.1545 0.90 0.1058 1.00 0.0321 Average precision over all relevant docs non-interpolated 0.3607

Document Level Averages Precision At 5 docs 0.6105 At 10 docs 0.5632 At 15 docs 0.5298 At 20 docs 0.4947 At 30 docs 0.4544 At 100 docs 0.3174 At 200 docs 0.2221 At 500 docs 0.1105 At 1000 docs 0.0598

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3881

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Royal Melbourne Institute of Technology

Summary Statistics Run Number mds004{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 18999 Relevant: 1399 Rel ret: 360

Recall Level Precision Averages Recall Precision 0.00 0.2854 0.10 0.0937 0.20 0.0454 0.30 0.0187 0.40 0.0091 0.50 0.0039 0.60 0.0000 0.70 0.0000 0.80 0.0000 0.90 0.0000 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.0268

Document Level Averages Precision At 5 docs 0.0947 At 10 docs 0.1158 At 15 docs 0.1018 At 20 docs 0.0921 At 30 docs 0.0930 At 100 docs 0.0705 At 200 docs 0.0476 At 500 docs 0.0292 At 1000 docs 0.0189

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.0867

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Royal Melbourne Institute of Technology

Summary Statistics Run Number mds005{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 18999 Relevant: 1399 Rel ret: 360

Recall Level Precision Averages Recall Precision 0.00 0.3597 0.10 0.1534 0.20 0.0790 0.30 0.0241 0.40 0.0100 0.50 0.0043 0.60 0.0000 0.70 0.0000 0.80 0.0000 0.90 0.0000 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.0371

Document Level Averages Precision At 5 docs 0.1474 At 10 docs 0.1211 At 15 docs 0.1298 At 20 docs 0.1237 At 30 docs 0.1123 At 100 docs 0.0811 At 200 docs 0.0558 At 500 docs 0.0338 At 1000 docs 0.0189

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1045

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - University of Massachusetts

Summary Statistics Run Number HIN300{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 542

Recall Level Precision Averages Recall Precision 0.00 0.6195 0.10 0.4539 0.20 0.2944 0.30 0.2094 0.40 0.1570 0.50 0.0929 0.60 0.0475 0.70 0.0250 0.80 0.0000 0.90 0.0000 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1519

Document Level Averages Precision At 5 docs 0.4211 At 10 docs 0.3789 At 15 docs 0.3544 At 20 docs 0.3184 At 30 docs 0.2789 At 100 docs 0.1805 At 200 docs 0.1139 At 500 docs 0.0555 At 1000 docs 0.0285

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2333

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - University of Massachusetts

Summary Statistics Run Number HIN301{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 540

Recall Level Precision Averages Recall Precision 0.00 0.6310 0.10 0.4561 0.20 0.2905 0.30 0.1912 0.40 0.1372 0.50 0.0857 0.60 0.0452 0.70 0.0236 0.80 0.0000 0.90 0.0000 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1481

Document Level Averages Precision At 5 docs 0.4105 At 10 docs 0.3737 At 15 docs 0.3614 At 20 docs 0.3105 At 30 docs 0.2719 At 100 docs 0.1763 At 200 docs 0.1100 At 500 docs 0.0548 At 1000 docs 0.0284

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2275

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Cornell University

Summary Statistics Run Number Cor5C1vt{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1286

Recall Level Precision Averages Recall Precision 0.00 0.7516 0.10 0.5991 0.20 0.5186 0.30 0.4341 0.40 0.3769 0.50 0.3245 0.60 0.2652 0.70 0.2238 0.80 0.1825 0.90 0.1086 1.00 0.0243 Average precision over all relevant docs non-interpolated 0.3266

Document Level Averages Precision At 5 docs 0.4842 At 10 docs 0.5105 At 15 docs 0.4632 At 20 docs 0.4368 At 30 docs 0.4175 At 100 docs 0.3026 At 200 docs 0.2279 At 500 docs 0.1222 At 1000 docs 0.0677

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3598

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - Cornell University

Summary Statistics Run Number Cor5C2ex{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1343

Recall Level Precision Averages Recall Precision 0.00 0.7744 0.10 0.5910 0.20 0.5302 0.30 0.4922 0.40 0.4079 0.50 0.3712 0.60 0.3100 0.70 0.2594 0.80 0.2165 0.90 0.1421 1.00 0.0284 Average precision over all relevant docs non-interpolated 0.3598

Document Level Averages Precision At 5 docs 0.5579 At 10 docs 0.4947 At 15 docs 0.4702 At 20 docs 0.4553 At 30 docs 0.4263 At 100 docs 0.3084 At 200 docs 0.2403 At 500 docs 0.1300 At 1000 docs 0.0707

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3829

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - George Mason University

Summary Statistics Run Number gmu96ca1{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1202

Recall Level Precision Averages Recall Precision 0.00 0.7304 0.10 0.5294 0.20 0.4621 0.30 0.4057 0.40 0.3479 0.50 0.2858 0.60 0.2566 0.70 0.2128 0.80 0.1515 0.90 0.0712 1.00 0.0088 Average precision over all relevant docs non-interpolated 0.2955

Document Level Averages Precision At 5 docs 0.4737 At 10 docs 0.4263 At 15 docs 0.4140 At 20 docs 0.4000 At 30 docs 0.3667 At 100 docs 0.2595 At 200 docs 0.1947 At 500 docs 0.1082 At 1000 docs 0.0633

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3296

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - George Mason University

Summary Statistics Run Number gmu96ca2{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1250

Recall Level Precision Averages Recall Precision 0.00 0.7600 0.10 0.5210 0.20 0.4838 0.30 0.4407 0.40 0.3875 0.50 0.3419 0.60 0.2992 0.70 0.2632 0.80 0.1911 0.90 0.1000 1.00 0.0171 Average precision over all relevant docs non-interpolated 0.3274

Document Level Averages Precision At 5 docs 0.4947 At 10 docs 0.4579 At 15 docs 0.4281 At 20 docs 0.4342 At 30 docs 0.4175 At 100 docs 0.2916 At 200 docs 0.2147 At 500 docs 0.1169 At 1000 docs 0.0658

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3571

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - George Mason University

Summary Statistics Run Number gmu96cm1{manual Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1234

Recall Level Precision Averages Recall Precision 0.00 0.7647 0.10 0.5539 0.20 0.4854 0.30 0.4349 0.40 0.3897 0.50 0.3451 0.60 0.2901 0.70 0.2417 0.80 0.1743 0.90 0.0879 1.00 0.0173 Average precision over all relevant docs non-interpolated 0.3279

Document Level Averages Precision At 5 docs 0.5263 At 10 docs 0.4737 At 15 docs 0.4386 At 20 docs 0.4368 At 30 docs 0.4070 At 100 docs 0.2826 At 200 docs 0.2084 At 500 docs 0.1138 At 1000 docs 0.0649

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3594

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - George Mason University

Summary Statistics Run Number gmu96cm2{manual Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1206

Recall Level Precision Averages Recall Precision 0.00 0.7857 0.10 0.5231 0.20 0.4791 0.30 0.4028 0.40 0.3270 0.50 0.2893 0.60 0.2660 0.70 0.2327 0.80 0.1666 0.90 0.1056 1.00 0.0259 Average precision over all relevant docs non-interpolated 0.3065

Document Level Averages Precision At 5 docs 0.5158 At 10 docs 0.4474 At 15 docs 0.4316 At 20 docs 0.4158 At 30 docs 0.3807 At 100 docs 0.2674 At 200 docs 0.1989 At 500 docs 0.1105 At 1000 docs 0.0635

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3290

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - University of California, Berkeley

Summary Statistics Run Number BrklyCH1{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1246

Recall Level Precision Averages Recall Precision 0.00 0.7429 0.10 0.5745 0.20 0.4758 0.30 0.4068 0.40 0.3513 0.50 0.3051 0.60 0.2709 0.70 0.2326 0.80 0.1874 0.90 0.1293 1.00 0.0280 Average precision over all relevant docs non-interpolated 0.3192

Document Level Averages Precision At 5 docs 0.4632 At 10 docs 0.4316 At 15 docs 0.4246 At 20 docs 0.4158 At 30 docs 0.3895 At 100 docs 0.2853 At 200 docs 0.2153 At 500 docs 0.1204 At 1000 docs 0.0656

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3565

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - University of California, Berkeley

Summary Statistics Run Number BrklyCH2{manual Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1364

Recall Level Precision Averages Recall Precision 0.00 0.8539 0.10 0.7507 0.20 0.6584 0.30 0.6008 0.40 0.5354 0.50 0.4715 0.60 0.4188 0.70 0.3486 0.80 0.2872 0.90 0.2194 1.00 0.0623 Average precision over all relevant docs non-interpolated 0.4610

Document Level Averages Precision At 5 docs 0.6526 At 10 docs 0.6316 At 15 docs 0.5965 At 20 docs 0.5895 At 30 docs 0.5351 At 100 docs 0.3842 At 200 docs 0.2634 At 500 docs 0.1346 At 1000 docs 0.0718

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.4642

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - CLARITECH Corporation

Summary Statistics Run Number CLCHNA{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1182

Recall Level Precision Averages Recall Precision 0.00 0.6223 0.10 0.4576 0.20 0.3854 0.30 0.3561 0.40 0.3206 0.50 0.2888 0.60 0.2527 0.70 0.2086 0.80 0.1533 0.90 0.0807 1.00 0.0109 Average precision over all relevant docs non-interpolated 0.2677

Document Level Averages Precision At 5 docs 0.3789 At 10 docs 0.3947 At 15 docs 0.3930 At 20 docs 0.3895 At 30 docs 0.3561 At 100 docs 0.2653 At 200 docs 0.2063 At 500 docs 0.1123 At 1000 docs 0.0622

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2998

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - CLARITECH Corporation

Summary Statistics Run Number CLCHNM{manual Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1253

Recall Level Precision Averages Recall Precision 0.00 0.7534 0.10 0.5923 0.20 0.5359 0.30 0.5150 0.40 0.4623 0.50 0.3893 0.60 0.2952 0.70 0.2435 0.80 0.1960 0.90 0.1070 1.00 0.0077 Average precision over all relevant docs non-interpolated 0.3583

Document Level Averages Precision At 5 docs 0.5263 At 10 docs 0.5158 At 15 docs 0.5333 At 20 docs 0.4947 At 30 docs 0.4561 At 100 docs 0.3316 At 200 docs 0.2226 At 500 docs 0.1204 At 1000 docs 0.0659

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3872

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - City University

Summary Statistics Run Number city96c1{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1203

Recall Level Precision Averages Recall Precision 0.00 0.7063 0.10 0.5513 0.20 0.4477 0.30 0.3753 0.40 0.3239 0.50 0.3007 0.60 0.2639 0.70 0.2078 0.80 0.1546 0.90 0.0897 1.00 0.0087 Average precision over all relevant docs non-interpolated 0.2943

Document Level Averages Precision At 5 docs 0.4842 At 10 docs 0.4632 At 15 docs 0.4175 At 20 docs 0.3895 At 30 docs 0.3561 At 100 docs 0.2589 At 200 docs 0.1971 At 500 docs 0.1099 At 1000 docs 0.0633

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3050

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision chinese results - City University

Summary Statistics Run Number city96c2{automatic Number of Topics 19 Total number of documents over all topics Retrieved: 19000 Relevant: 1399 Rel ret: 1258

Recall Level Precision Averages Recall Precision 0.00 0.6618 0.10 0.5146 0.20 0.4412 0.30 0.3807 0.40 0.3400 0.50 0.2916 0.60 0.2614 0.70 0.2289 0.80 0.1953 0.90 0.1326 1.00 0.0153 Average precision over all relevant docs non-interpolated 0.2933

Document Level Averages Precision At 5 docs 0.4316 At 10 docs 0.3842 At 15 docs 0.3895 At 20 docs 0.3737 At 30 docs 0.3456 At 100 docs 0.2600 At 200 docs 0.2037 At 500 docs 0.1174 At 1000 docs 0.0662

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3055

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

1 10 23

Median

Topics

Average Precision