filtering results - pir

Table 1: Raw Data

Run 1 Run 2 Run 3 topic set pool sample set pool sample set pool sample size util. util. size util. util. size util. util.

3 11 3.0 3.0 +/- 0.0 74 48.0 48.0 +/- 0.0 95 201.0 201.0 +/- 0.0 5 40 24.0 24.0 +/- 0.0 59 43.0 43.0 +/- 0.0 108 220.0 229.9 +/- 11.4 14 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 17 4 4.0 4.0 +/- 0.0 14 14.0 14.0 +/- 0.0 283 557.0 548.7 +/- 84.6 20 89 45.0 24.3 +/- 37.7 196 94.0 46.9 +/- 72.1 310 450.0 309.9 +/- 93.4 27 25 -31.0 -31.0 +/- 0.0 401 -267.0 -236.7 +/- 182.7 809 -393.0 -351.6 +/- 227.2 28 4 0.0 0.0 +/- 0.0 178 24.0 -5.3 +/- 84.6 381 271.0 235.2 +/- 127.7 29 0 0.0 0.0 +/- 0.0 15 1.0 1.0 +/- 0.0 15 17.0 17.0 +/- 0.0 30 3 -1.0 -1.0 +/- 0.0 47 -9.0 -9.0 +/- 0.0 445 -69.0 51.5 +/- 177.6 31 0 0.0 0.0 +/- 0.0 58 30.0 30.2 +/- 10.3 143 221.0 230.5 +/- 31.9 32 103 -73.0 -309.0 +/- 0.0 198 -28.0 -198.0 +/- 0.0 261 99.0 -261.0 +/- 0.0 35 131 -109.0 -11.9 +/- 69.9 180 -12.0 37.3 +/- 72.0 470 22.0 203.4 +/- 166.7 36 92 -120.0 -124.5 +/- 49.1 178 -62.0 -65.8 +/- 62.2 253 7.0 7.9 +/- 67.2 40 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 41 1 -3.0 -3.0 +/- 0.0 3 -1.0 -1.0 +/- 0.0 19 13.0 13.0 +/- 0.0 43 1 -3.0 -3.0 +/- 0.0 13 -3.0 -3.0 +/- 0.0 46 22.0 22.0 +/- 0.0 44 12 4.0 4.0 +/- 0.0 53 29.0 29.0 +/- 0.0 155 249.0 260.7 +/- 42.1 45 10 2.0 2.0 +/- 0.0 64 16.0 16.8 +/- 12.8 377 259.0 229.8 +/- 164.4 46 0 0.0 0.0 +/- 0.0 5 -5.0 -5.0 +/- 0.0 16 -16.0 -16.0 +/- 0.0 47 0 0.0 0.0 +/- 0.0 14 2.0 2.0 +/- 0.0 33 51.0 51.0 +/- 0.0 48 4 -12.0 -12.0 +/- 0.0 4 -4.0 -4.0 +/- 0.0 4 -4.0 -4.0 +/- 0.0 49 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 109 147.0 152.6 +/- 12.1 50 90 -270.0 -270.0 +/- 0.0 285 -285.0 -285.0 +/- 0.0 285 -285.0 -285.0 +/- 0.0 63 63 -1.0 1.5 +/- 19.8 111 37.0 40.5 +/- 22.8 129 199.0 205.9 +/- 22.8 66 12 -12.0 -12.0 +/- 0.0 101 -53.0 -52.9 +/- 10.6 110 -6.0 -5.9 +/- 10.6 76 1 1.0 1.0 +/- 0.0 56 -10.0 -10.0 +/- 0.0 68 44.0 44.0 +/- 0.0 82 38 -14.0 -14.0 +/- 0.0 38 12.0 12.0 +/- 0.0 64 84.0 84.0 +/- 0.0 84 4 -12.0 -12.0 +/- 0.0 6 -4.0 -4.0 +/- 0.0 6 -2.0 -2.0 +/- 0.0 94 23 23.0 23.0 +/- 0.0 41 35.0 35.0 +/- 0.0 97 243.0 243.0 +/- 0.0 95 14 10.0 10.0 +/- 0.0 42 34.0 34.0 +/- 0.0 119 209.0 208.2 +/- 19.7 96 22 22.0 22.0 +/- 0.0 24 24.0 24.0 +/- 0.0 135 177.0 177.2 +/- 28.2 100 48 44.0 44.0 +/- 0.0 51 49.0 49.0 +/- 0.0 89 255.0 255.0 +/- 0.0 103 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 106 2 2.0 2.0 +/- 0.0 5 3.0 3.0 +/- 0.0 13 15.0 15.0 +/- 0.0 113 15 -5.0 -5.0 +/- 0.0 15 5.0 5.0 +/- 0.0 39 53.0 53.0 +/- 0.0 115 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 12 8.0 8.0 +/- 0.0 117 10 6.0 6.0 +/- 0.0 10 8.0 8.0 +/- 0.0 44 64.0 64.0 +/- 0.0 119 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 123 7 -1.0 -1.0 +/- 0.0 32 10.0 10.0 +/- 0.0 138 162.0 145.5 +/- 30.3 125 2 -2.0 -2.0 +/- 0.0 2 0.0 0.0 +/- 0.0 161 175.0 199.9 +/- 38.9 142 10 10.0 10.0 +/- 0.0 10 10.0 10.0 +/- 0.0 39 117.0 117.0 +/- 0.0 143 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 73 127.0 127.0 +/- 0.0 161 1 1.0 1.0 +/- 0.0 58 46.0 46.0 +/- 0.0 91 173.0 173.0 +/- 0.0 169 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 171 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 173 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 10 18.0 18.0 +/- 0.0 174 2 2.0 2.0 +/- 0.0 49 47.0 47.0 +/- 0.0 49 143.0 143.0 +/- 0.0 182 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 188 2 2.0 2.0 +/- 0.0 2 2.0 2.0 +/- 0.0 2 6.0 6.0 +/- 0.0 191 0 0.0 0.0 +/- 0.0 15 3.0 3.0 +/- 0.0 45 47.0 47.0 +/- 0.0