filtering results - HNC

Summary Statistics Run Number HNC–category A, manual Number of Topics 50 Total number of documents over all topics Run 1 Run 2 Run 3 Retrieved: 250 1079 3930 Relevant: 6576 6576 6576 Rel ret: 172 490 1249

Average Effectiveness

(Pooled Sample) Recall Precision Fallout Run 1 0.020 0.259 0.0000 Run 2 0.059 0.326 0.0001 Run 3 0.171 0.342 0.0003

Number of topics where this site’s Utility was Mean 1st 2nd 3rd 4th Rank Pooled Run 1 15 15 20 0 2.367 Run 2 13 12 21 4 2.143 Run 3 7 10 30 3 2.633 Sampled Run 1 14 16 20 0 2.163 Run 2 13 14 19 4 2.327 Run 3 6 10 30 4 2.694 filtering results - HNC