Genomics track, ad hoc task results — York University

Summary Statistics Run ID york04g1 Run Description automatic run using title+need+context Number of Topics 50 Total number of documents over all topics Retrieved: 49560 Relevant: 8268 Rel-ret: 3732

Recall Level Precision Averages

Recall Precision 0.00 0.6813 0.10 0.4264 0.20 0.3220 0.30 0.2229 0.40 0.1670 0.50 0.1223 0.60 0.0958 0.70 0.0801 0.80 0.0521 0.90 0.0380 1.00 0.0203 Average precision over all relevant docs non-interpolated 0.1794

Document Level Averages Precision At 5 docs 0.4520 At 10 docs 0.4140 At 15 docs 0.4013 At 20 docs 0.3930 At 30 docs 0.3747 At 100 docs 0.2696 At 200 docs 0.1891 At 500 docs 0.1098 At 1000 docs 0.0746 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2201